From 0f74c8bad0b176f808cdf53911f70d5d791823fe Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Tue, 24 Jan 2023 19:19:09 +1100
Subject: Adjust limits and timeouts

Increase MAX_REQ_EVENTS in chrona.py. Without this, a large-screened
client might request with a limit of 700 events, more than the
previous server limit of 500, causing the client to display nothing.

Reduce onEventDisplay() throttling timeout in App.vue, for faster
user responsiveness.
---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 4a8c3d9..186bf40 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -370,7 +370,7 @@ function onEventDisplay(
 	timelineTimeouts.set(timelineId, window.setTimeout(async () => {
 		timelineTimeouts.delete(timelineId);
 		handleOnEventDisplay(timelineId, eventIds, firstDate, lastDate, scaleIdx);
-	}, 200));
+	}, 100));
 }
 
 // ========== For info modal ==========
-- 
cgit v1.2.3

