From 314c1c95f77d6e4be559df3a58278f6c37f61e5c Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Tue, 11 Oct 2022 00:47:29 +1100
Subject: Fix regression where baseline timespans move on startup

---
 src/App.vue | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 308137b..f32b367 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -48,10 +48,8 @@ const contentAreaRef = ref(null as HTMLElement | null);
 const store = useStore();
 
 // For content sizing (used to decide between horizontal and vertical mode)
-const contentWidth = ref(window.innerWidth);
-const contentHeight = ref(window.innerHeight);
-	// Setting this and contentWidth to 0 makes it likely that 'vert' will change on startup,
-		// and trigger unwanted transitions (like baseline spans changing size)
+const contentWidth = ref(0);
+const contentHeight = ref(0);
 const vert = computed(() => contentHeight.value > contentWidth.value);
 function updateAreaDims(){
 	let contentAreaEl = contentAreaRef.value!;
-- 
cgit v1.2.3

