From 4bfd6889b2d6184f5500f47231b8288b4c04df04 Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Tue, 5 Jul 2022 13:55:50 +1000
Subject: Revert to showing px in settings instead of mm

With mm, moving the slider would sometimes leave the value unchanged
---
 src/App.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index 1a5cb44..03a254b 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -798,7 +798,6 @@ export default defineComponent({
 				// Update layout/ui options with defaults, excluding user-modified ones
 				let lytOpts = getDefaultLytOpts();
 				let uiOpts = getDefaultUiOpts(lytOpts);
-				console.log(uiOpts.touchDevice)
 				let changedTree = false;
 				for (let prop of Object.getOwnPropertyNames(lytOpts) as (keyof LayoutOptions)[]){
 					let item = localStorage.getItem('LYT ' + prop);
-- 
cgit v1.2.3

