From 9e8e30c5c680ca81862e4fba5f7ae9ecea62b8ff Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Mon, 4 Jul 2022 21:19:11 +1000
Subject: Update IconButton to maintain equal width/height

---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index f98e4e9..5cd5ac8 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -3,7 +3,7 @@
 	:style="{backgroundColor: uiOpts.bgColor}">
 	<!-- Title bar -->
 	<div class="flex shadow gap-2 p-2" :style="{backgroundColor: uiOpts.bgColorDark2, color: uiOpts.altColor}">
-		<h1 class="my-auto mx-2 text-4xl">Tilo</h1>
+		<h1 class="my-auto ml-2 text-4xl">Tilo</h1>
 		<div class="mx-auto"/> <!-- Spacer -->
 		<!-- Icons -->
 		<icon-button :disabled="isDisabled('help')" :size="45" :style="buttonStyles" @click="onHelpIconClick">
-- 
cgit v1.2.3

