From e3a86973922fa9370900f2e3b07a78222e44b056 Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Wed, 29 Jun 2022 14:49:01 +1000
Subject: Remove constant-scrollbar-gap for ancestry-bar

Avoided having overflow:auto cause tile-overlapping scrollbar by
using less tile-padding. Trying to solve this by dynamically
detecting overflow seemed to get messy.
---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index d16ad68..7fca4c5 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -149,7 +149,7 @@ function getDefaultUiOpts(lytOpts: LayoutOptions): UiOptions {
 		nonleafHeaderColor: bgColorDark,
 		ancestryBarBgColor: bgColorLight,
 		// Component sizing
-		ancestryBarBreadth: lytOpts.maxTileSz / 2 + lytOpts.tileSpacing*2 + scrollGap, // px
+		ancestryBarBreadth: lytOpts.maxTileSz / 2 + lytOpts.tileSpacing*2, // px
 		tutPaneSz: 200, // px
 		scrollGap,
 		// Timing related
-- 
cgit v1.2.3

