From eb72584af8f5a598740a87ee024d0d899fdffc8d Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Thu, 26 May 2022 01:06:16 +1000
Subject: Trim otol tree to avoid certain slowdowns

Some nodes had multiple ancestors with over 10k children, and
jump-searching to them could take almost a minute for vue to load.
---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index b609204..f545e8f 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -65,7 +65,7 @@ const defaultUiOpts = {
 	shadowFocused: '0 0 1px 2px orange',
 	infoIconSz: 18, //px
 	infoIconMargin: 2, //px
-	tipThresholds: [[1, 'greenyellow'], [100, 'orange'], [1000, 'red']],
+	tipThresholds: [[1, 'greenyellow'], [30, 'orange'], [100, 'red']],
 	headerColor: '#fafaf9',
 	// For leaf tiles
 	leafTilePadding: 4, //px
-- 
cgit v1.2.3

