From d554c2ffc79dccc366626270760a73a7cf6772aa Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Tue, 5 Jul 2022 16:09:02 +1000
Subject: Remove some redundant display:block specifiers

---
 src/components/LoadingModal.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/LoadingModal.vue')

diff --git a/src/components/LoadingModal.vue b/src/components/LoadingModal.vue
index 6ef7a97..a338670 100644
--- a/src/components/LoadingModal.vue
+++ b/src/components/LoadingModal.vue
@@ -2,7 +2,7 @@
 <div class="fixed left-0 top-0 w-full h-full bg-black/40">
 	<div class="absolute left-1/2 -translate-x-1/2 top-1/2 -translate-y-1/2
 		flex items-center py-3 px-3 gap-2" :style="styles">
-		<loader-icon class="block w-12 h-12 animate-[spin_6s_linear_infinite]"/>
+		<loader-icon class="w-12 h-12 animate-[spin_6s_linear_infinite]"/>
 		<div class="whitespace-nowrap">Querying server ...</div>
 	</div>
 </div>
-- 
cgit v1.2.3

