From 345c96f99aa98d5e90a46fa3f175ec0a2e6d4f36 Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Sat, 9 Jul 2022 11:49:39 +1000
Subject: Fix links-to-node failing on load

Was setting SERVER_URL incorrectly
Also changed server API to include 'excl' param
---
 src/components/SearchModal.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/SearchModal.vue')

diff --git a/src/components/SearchModal.vue b/src/components/SearchModal.vue
index 990312a..9dc8f9b 100644
--- a/src/components/SearchModal.vue
+++ b/src/components/SearchModal.vue
@@ -206,7 +206,8 @@ export default defineComponent({
 			let urlParams = new URLSearchParams({
 				type: 'node',
 				name: tolNodeName,
-				toroot: this.activeRoot.name,
+				toroot: '1',
+				excl: this.activeRoot.name,
 				tree: this.uiOpts.tree,
 			});
 			this.$emit('net-wait'); // Allows the parent component to show a loading-indicator
-- 
cgit v1.2.3

