From 81444240bbb3de18fdace459a61d461ef46dc16a Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Sun, 27 Mar 2022 12:01:56 +1100
Subject: Remove redundant full-view div

---
 src/components/Settings.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/Settings.vue')

diff --git a/src/components/Settings.vue b/src/components/Settings.vue
index 008632e..3bb0c7d 100644
--- a/src/components/Settings.vue
+++ b/src/components/Settings.vue
@@ -9,7 +9,6 @@ export default defineComponent({
 	},
 	methods: {
 		closeClicked(evt: Event){
-			console.log(evt.target)
 			if (evt.target == this.$el || (this.$refs.closeIcon as HTMLElement).contains(evt.target as HTMLElement)){
 				this.$emit('settings-close');
 			}
-- 
cgit v1.2.3

