From 23436a9ad4c2a710c7f0d49a07a720e0153d8225 Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Sun, 24 Apr 2022 16:58:31 +1000
Subject: Fix z-index not being higher for tiles being expanded/collapsed

---
 src/components/SettingsPane.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/SettingsPane.vue')

diff --git a/src/components/SettingsPane.vue b/src/components/SettingsPane.vue
index 990d1f7..13a7f26 100644
--- a/src/components/SettingsPane.vue
+++ b/src/components/SettingsPane.vue
@@ -112,7 +112,7 @@ export default defineComponent({
 	</div>
 	<hr class="border-stone-400"/>
 	<div>
-		<label>Animation Duration <input type="range" min="0" max="1000" class="mx-2 w-[3cm]"
+		<label>Animation Duration <input type="range" min="0" max="3000" class="mx-2 w-[3cm]"
 			v-model.number="uiOpts.tileChgDuration"/></label>
 	</div>
 </div>
-- 
cgit v1.2.3

