From 764e5668d54e9af96dddcc8dd386d4cd8958d75a Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Sat, 30 Apr 2022 14:20:46 +1000
Subject: Make TileInfoModal display more data

---
 src/components/Tile.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/Tile.vue')

diff --git a/src/components/Tile.vue b/src/components/Tile.vue
index 2ab1df1..3dd4146 100644
--- a/src/components/Tile.vue
+++ b/src/components/Tile.vue
@@ -88,9 +88,9 @@ export default defineComponent({
 		leafStyles(): Record<string,string> {
 			return {
 				// Image (and scrims)
-				backgroundImage: this.tolNode.imgFile != null ?
+				backgroundImage: this.tolNode.img?.filename != null ?
 					'linear-gradient(to bottom, rgba(0,0,0,0.4), #0000 40%, #0000 60%, rgba(0,0,0,0.4) 100%),' +
-						'url(\'/img/' + this.tolNode.imgFile.replaceAll('\'', '\\\'') + '\')' :
+						'url(\'/img/' + this.tolNode.img.filename.replaceAll('\'', '\\\'') + '\')' :
 					'none',
 				backgroundColor: '#1c1917',
 				backgroundSize: 'cover',
-- 
cgit v1.2.3

