From d554c2ffc79dccc366626270760a73a7cf6772aa Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Tue, 5 Jul 2022 16:09:02 +1000
Subject: Remove some redundant display:block specifiers

---
 src/components/TileInfoModal.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/TileInfoModal.vue')

diff --git a/src/components/TileInfoModal.vue b/src/components/TileInfoModal.vue
index 8c2363b..92d19de 100644
--- a/src/components/TileInfoModal.vue
+++ b/src/components/TileInfoModal.vue
@@ -5,7 +5,7 @@
 		:style="styles">
 		<div class="pb-1 md:pb-2">
 			<close-icon @click.stop="onClose" ref="closeIcon"
-				class="block absolute top-1 right-1 md:m-2 w-8 h-8 hover:cursor-pointer"/>
+				class="absolute top-1 right-1 md:m-2 w-8 h-8 hover:cursor-pointer"/>
 			<h1 class="text-center text-xl font-bold pt-2 pb-1 mx-10 md:text-2xl md:pt-3 md:pb-1">
 				{{getDisplayName(nodeName, tolNode)}}
 			</h1>
-- 
cgit v1.2.3

