From 083b96a5040ccc71d2c0fc13e374d19ad2454161 Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Sun, 27 Mar 2022 08:54:37 +1100
Subject: Fix close-button unreliability bug

---
 src/components/TileTree.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/TileTree.vue')

diff --git a/src/components/TileTree.vue b/src/components/TileTree.vue
index 9f64252..af3965e 100644
--- a/src/components/TileTree.vue
+++ b/src/components/TileTree.vue
@@ -471,7 +471,7 @@ export default defineComponent({
 		@sepd-parent-clicked="onSepdParentClicked" @info-icon-clicked="onInnerInfoIconClicked"/>
 	<!-- Settings -->
 		<!-- outer div prevents overflow from transitioning to/from off-screen -->
-	<div class="fixed left-0 top-0 w-full h-full overflow-hidden invisible" @click="closeClicked">
+	<div class="fixed left-0 top-0 w-full h-full overflow-hidden invisible">
 		<transition name="slide-bottom-right">
 			<settings v-if="settingsOpen" :layoutOptions="layoutOptions" :componentOptions="componentOptions"
 				@settings-close="onSettingsClose" @layout-option-change="onLayoutOptionChange"/>
-- 
cgit v1.2.3

