From 9e8e30c5c680ca81862e4fba5f7ae9ecea62b8ff Mon Sep 17 00:00:00 2001
From: Terry Truong <terry06890@gmail.com>
Date: Mon, 4 Jul 2022 21:19:11 +1000
Subject: Update IconButton to maintain equal width/height

---
 src/components/TutorialPane.vue | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'src/components/TutorialPane.vue')

diff --git a/src/components/TutorialPane.vue b/src/components/TutorialPane.vue
index 430db8a..0734d0b 100644
--- a/src/components/TutorialPane.vue
+++ b/src/components/TutorialPane.vue
@@ -7,8 +7,7 @@
 	</h1>
 	<transition name="fade" mode="out-in">
 		<div v-if="stage == 0" :style="contentStyles">
-			This is a visualiser for the biological Tree of Life. For more information,
-			<a href="#" :style="{color: uiOpts.altColor}">{{touchDevice ? 'tap' : 'click'}} here</a>.
+			This site provides a visualisation for the biological Tree of Life.
 		</div>
 		<div v-else-if="stage == 1" :style="contentStyles">
 			{{touchDevice ? 'Tap' : 'Click'}} a tile to expand it and show it's children
-- 
cgit v1.2.3

